;
; Definition file for the DLL version of the NpLibeay library from OpenSSL
;

LIBRARY         NPLIBEAY	

DESCRIPTION     'OpenSSL: implementation of Secure Socket Layer 0.9.7d, LIBEAY - http://www.openssl.org/'

EXPORTS
    EVP_aes_128_cbc                         @2927
    EVP_CIPHER_CTX_init                     @961
    EVP_CIPHER_CTX_cleanup                  @256
    EVP_EncryptInit                         @275
    EVP_EncryptUpdate                       @276
    EVP_EncryptFinal                        @274
    EVP_DecryptInit                         @265
    EVP_DecryptUpdate                       @266
    EVP_DecryptFinal                        @264

    d2i_RSAPrivateKey                       @750
    d2i_RSAPublicKey                        @753
    i2d_RSAPrivateKey                       @853
    i2d_RSAPublicKey                        @856

    RSA_private_encrypt                     @491
    RSA_public_encrypt                      @493
    RSA_private_decrypt                     @490
    RSA_public_decrypt                      @492
	RSA_free								@484
    RSA_generate_key                        @485
    RSA_verify                              @498
	RSA_size

    ERR_get_error                           @227
    ERR_error_string                        @223
	ERR_error_string_n
    MD5                                     @339
    RAND_bytes                              @464
